ALTER TABLE `ec_panel` 
ADD COLUMN `allowedIOTypes` varchar(500) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT 'allowedIOTypes';