ALTER TABLE ec_project ADD `IO_predicted_issue` VARCHAR(50) NULL;
ALTER TABLE ec_project ADD `IO_predicted_construct` VARCHAR(50) NULL;
ALTER TABLE ec_project ADD `IO_real_issue` VARCHAR(50) NULL;
ALTER TABLE ec_project ADD `IO_real_construct` VARCHAR(50) NULL;
 